743 Eugenisis – UCAC2 36464774

2005 dec 31 5h57.8m U.T.

Planet : Star : Source cat. UCAC2

V. mag. = 14.00 Diam. = 55.7 km = 0.04" α = 8h14m11.187s δ = +13#00’37.35" μ = 27.81"/h π = 4.94" Ref. = EG2001-007 V. mag. = 11.92 Ph. mag. = 0.00 Δm = 2.2 Max. dur. = 5.6s Sun : 155# Moon : 155# , 0%

Vis. magn. scale 2 3 4 5 6 7 8 9 10 11

Right ascension (2000.0)

Declination (2000.0)

5h49m00s - 6h06m00s; int. 1m

A05_1274.PS : 2004-04-15 14:25:47 2817 Agfa-Gevaert N.V., Mortsel, Belgium