Occultation of ACT1211328 (8.6mag) by (93) Minerva on 1996/11/25

0.10"

N

S E W

-300 -200 -100 +0 +100 +200 X km +500

+600

+700

+800

+900

Y km

Ohkura N.40s 16h52m00s

Akazawa H.40s

16h52m00s